\section{\class{wxFlexGridSizer}}\label{wxflexgridsizer}

A flex grid sizer is a sizer which lays out its children in a two-
dimensional table with all table fields in one row having the same 
height and all fields in one column having the same width.

\wxheading{Derived from}

\helpref{wxGridSizer}{wxsizer}\\
\helpref{wxSizer}{wxsizer}\\
\helpref{wxObject}{wxobject}

\membersection{wxFlexGridSizer::wxFlexGridSizer}\label{wxflexgridsizerwxflexgridsizer}

\func{}{wxFlexGridSizer}{\param{int }{rows}, \param{int }{cols}, \param{int }{vgap}, \param{int }{hgap}}

\func{}{wxFlexGridSizer}{\param{int }{cols}, \param{int }{vgap = 0}, \param{int }{hgap = 0}}

Constructor for a wxGridSizer. {\it rows} and {\it cols} determine the number of
columns and rows in the sizer - if either of the parameters is zero, it will be
calculated form the total number of children in the sizer, thus making the
sizer grow dynamically. {\it vgap} and {\it hgap} define extra space between
all children.


