% -----------------------------------------------------------------------------
% wxBufferedInputStream
% -----------------------------------------------------------------------------
\section{\class{wxBufferedInputStream}}\label{wxbufferedinputstream}

This stream acts as a cache. It caches the bytes read from the specified
input stream (See \helpref{wxFilterInputStream}{wxfilterinputstream}).
It uses wxStreamBuffer and sets the default in-buffer size to 1024 bytes.
This class may not be used without some other stream to read the data
from (such as a file stream or a memory stream).

\wxheading{Derived from}

\helpref{wxFilterInputStream}{wxfilterinputstream}

\wxheading{Include files}

<wx/stream.h>

\wxheading{See also}

\helpref{wxStreamBuffer}{wxstreambuffer}, \helpref{wxInputStream}{wxinputstream}

% -----------------------------------------------------------------------------
% wxBufferedOutputStream
% -----------------------------------------------------------------------------
\section{\class{wxBufferedOutputStream}}\label{wxbufferedoutputstream}

This stream acts as a cache. It caches the bytes to be written to the specified
output stream (See \helpref{wxFilterOutputStream}{wxfilteroutputstream}). The
datas are only written when the cache is full or when the buffered stream is
destroyed.
This class may not be used without some other stream to write the data
to (such as a file stream or a memory stream).

\wxheading{Derived from}

\helpref{wxFilterOutputStream}{wxfilteroutputstream}

\wxheading{Include files}

<wx/stream.h>

\wxheading{See also}

\helpref{wxStreamBuffer}{wxstreamBuffer}, \helpref{wxOutputStream}{wxoutputstream}

